﻿GO
SET ANSI_NULLS, ANSI_PADDING, ANSI_WARNINGS, ARITHABORT, CONCAT_NULL_YIELDS_NULL, QUOTED_IDENTIFIER ON;

SET NUMERIC_ROUNDABORT OFF;


--GO
--/*
--Table [dbo].[T_FELJEGYZESTIPUS] is being dropped.  Deployment will halt if the table contains data.
--*/

--IF EXISTS (select top 1 1 from [dbo].[T_FELJEGYZESTIPUS])
--    RAISERROR (N'Rows were detected. The schema update is terminating because data loss might occur.', 16, 127) WITH NOWAIT


GO
PRINT N'Dropping [dbo].[FK_T_21038_4028111]...';


GO
ALTER TABLE [dbo].[T_FELJEGYZESTIPUS] DROP CONSTRAINT [FK_T_21038_4028111];


GO
PRINT N'Dropping [dbo].[FK_402811002_402811000]...';


GO
ALTER TABLE [dbo].[T_FELJEGYZESTIPUS] DROP CONSTRAINT [FK_402811002_402811000];


GO
PRINT N'Dropping [dbo].[FK_402811005_402811003]...';


GO
ALTER TABLE [dbo].[T_FELJEGYZESTIPUS] DROP CONSTRAINT [FK_402811005_402811003];


GO
PRINT N'Dropping [dbo].[T_FELJEGYZESTIPUS_OSSZES]...';


GO
DROP VIEW [dbo].[T_FELJEGYZESTIPUS_OSSZES];


GO
PRINT N'Dropping [dbo].[T_FELJEGYZESTIPUS]...';


GO
DROP TABLE [dbo].[T_FELJEGYZESTIPUS];


GO
PRINT N'Dropping [auditlog].[usp_AsyncAuditFELJEGYZESTIPUS]...';


GO
DROP PROCEDURE [auditlog].[usp_AsyncAuditFELJEGYZESTIPUS];


GO
PRINT N'Update complete.';


GO
